MODIFY CRONTAB USER ACCESS

The Modify Crontab User Access window allows you to modify a selected
crontab entry. The window has the following fields:

Hostname field

If you want to limit this job to specific hostnames within a pool,
enter those hostnames in this field. If you are using multiple entries,
leave a blank between each entry. You can also use the arrow button to
the right to select the available hosts from the current pool.

User Name field

You can use this field to specify which user will run this job. You can
also click on the arrow button on the right to display a list of users
and select one.

Description field

You can use this field to briefly describe this job's purpose.

Command field

Specify the cron command (and arguments) to be run at the time
established by the remaining five fields.You can use a maximum of 256
characters to specify this command.

Minutes field

Specify what point in the specified hour(s) the job will run. Enter a
whole number between 0 and 59. Or you can specify a range by using a
dash(-), e.g., 0-20. If you are using multiple entries, leave a blank
between each entry.

Hours of Day

Days of month

Months of the Year

Days of the Week

Click on the appropriate boxes in these fields to further define when
this job will run. You may select multiple values for each field.

